X-Git-Url: https://scm.cri.mines-paristech.fr/git/pipstransfo.git/blobdiff_plain/bd0a0fff20a7047fda68c96e618ad5d64a88f065..06f75b6a5ef8d367188514ab4c0c8b41e17327ef:/pipstransfo.tex?ds=sidebyside

diff --git a/pipstransfo.tex b/pipstransfo.tex
index 454f0c5..ebd608a 100644
--- a/pipstransfo.tex
+++ b/pipstransfo.tex
@@ -259,7 +259,9 @@
 \end{description}
 
 
-\section{References}
+\nocite{*}
+\bibliographystyle{alpha}
+\bibliography{refs}
 
 
 \end{document}
